The situation at Savoy Garden

This is the scene at Savoy Garden, about a kilometre from the Ayer Itam Dam, after houses on private land were demolished.

Residents in remaining homes are now worried.

The land is being cleared for a crematorium and columbarium project.

From what I hear, no EIA was required for this project.

I think it is not very wise to clear hill-sides and dump debris into the stream at a time when many are worried about flash floods.